         180           8
   1.44147063384760        1.19893813408871       0.999724598684429     
  0.787548046254008       0.589156413271647       0.446775394132975     
  0.305096387761502       6.621533156152024E-002
  -18.3673377116683       -18.2580008913821       -17.9411068534680     
  -17.5985223778791       -17.2547977186611       -16.8312475845175     
  -16.4767513319111       -15.9671995248462     
 -2.670798693657471E-004  0.000000000000000E+000
  0.992610991284962       0.000000000000000E+000
  0.995353386109756       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
