         180           3
   1.61496678043991        3.42100121447570        5.53954092274380     
   16.3389783334992        16.9064745627201        17.6663165760593     
 -7.156042848333838E-004  0.000000000000000E+000
   1.00165744199834       0.000000000000000E+000
  0.998388104193643       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
