         180           8
  -2.07453991970225       -2.32649407287006       -2.45644465729940     
  -2.56911756134137       -2.69381632014575       -2.81054114489800     
  -2.94672196590143       -3.03946456588541     
  -17.7807639183691       -17.6765134262659       -17.4238916781515     
  -17.0378692230551       -16.5718247577324       -16.1319919046655     
  -15.7073596407295       -15.3013770266950     
 -2.345050080879617E-004  0.000000000000000E+000
  0.992266951425494       0.000000000000000E+000
  0.995155034280312       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
