         180           8
 -0.947717516670596       -1.12851666067462       -1.27779995888271     
  -1.39140279678838       -1.51853065300957       -1.62372906974192     
  -1.69131505094910       -1.78662922184829     
  -17.8937971592094       -17.6960323290257       -17.3987768146624     
  -17.0244290576339       -16.5777115533197       -16.1555502164731     
  -15.7274609108643       -15.1788163762870     
 -3.594336252381150E-004  0.000000000000000E+000
  0.992909774365518       0.000000000000000E+000
  0.995610535105155       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
