         180           3
   1.49182138585554        3.18558127202685        5.13701687307354     
   15.9100718540200        16.4805502669868        17.3226828451836     
 -5.453428230147301E-004  0.000000000000000E+000
   1.00125602669221       0.000000000000000E+000
  0.997819443703600       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
