         180           8
 -0.712941173463859      -0.895270671205402       -1.02710408450689     
  -1.18017502923363       -1.34018929860266       -1.48294630736496     
  -1.61677566192651       -1.68861419577566     
  -18.1137373037919       -17.9215285654764       -17.6180200668583     
  -17.2868670513692       -16.8841935433071       -16.4425437845296     
  -16.0099937320062       -15.5437908341053     
 -4.284083355839149E-004  0.000000000000000E+000
  0.992849871782950       0.000000000000000E+000
  0.995508450184243       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
