         180           3
   1.13018942216165        2.87329456701855        4.97724699667538     
   15.4054885923732        16.1807232883747        17.1039875651702     
 -5.272211119087167E-004  0.000000000000000E+000
   1.00145120801503       0.000000000000000E+000
  0.998231191161411       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
