         180           8
 -0.298438834117605      -0.492100289705469      -0.713980307840516     
 -0.845144071605087      -0.988964294652055       -1.10074388241029     
  -1.23219077963039       -1.32067613376307     
  -18.6605644651712       -18.4730951450197       -18.1984183863607     
  -17.8063461726800       -17.3758395841150       -16.9458550848383     
  -16.4478262181570       -15.9141170903300     
 -4.218169426259210E-004  0.000000000000000E+000
  0.992595319876100       0.000000000000000E+000
  0.995477793294516       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
