         180           3
   1.40376237516913        3.09882062625761        4.96565945524560     
   15.5635174344319        16.2182041598365        16.7303891280309     
 -5.100997328647400E-004  0.000000000000000E+000
   1.00145188649903       0.000000000000000E+000
  0.998324589537237       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
