         180           8
  5.700335318377813E-002 -0.135847834543355      -0.249163164234842     
 -0.381557785931816      -0.555238693681196      -0.697470276688017     
 -0.840866786863420      -0.924743252004887     
  -18.4038177557301       -18.2314882764781       -17.8916251968419     
  -17.5417367793987       -17.2376334952840       -16.8974399340891     
  -16.5261929185583       -16.2244255521720     
 -4.300180710550481E-004  0.000000000000000E+000
  0.992657467957363       0.000000000000000E+000
  0.995546513089271       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
