         180           8
 -0.312150012687760      -0.393907248281858      -0.559332270056639     
 -0.698623737826506      -0.841842278949732      -0.979148387428317     
  -1.05029450641330       -1.15210851864529     
  -18.0905967655687       -17.8391276008653       -17.4714920711935     
  -17.0768261482359       -16.7003231419315       -16.3154933822806     
  -15.8930522955236       -15.3454147423019     
 -5.953315079792212E-004  0.000000000000000E+000
  0.992576979644911       0.000000000000000E+000
  0.995503683971630       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
