         180           8
 -0.718118152089893      -0.935662465270909       -1.03626511016592     
  -1.16128916626144       -1.34350806458930       -1.47087948795533     
  -1.58179302037712       -1.62532322569596     
  -17.1052891445089       -16.9479632409561       -16.6519658508632     
  -16.3220426668051       -15.9652250666996       -15.5779131329055     
  -15.1694556516071       -14.7117176067125     
 -5.968312806354983E-004  0.000000000000000E+000
  0.992929113485044       0.000000000000000E+000
  0.995821111393680       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
