         180           8
  8.632307223816153E-002 -8.349450400384720E-002 -0.309575373700231     
 -0.487201085231386      -0.623896959014014      -0.719599843740081     
 -0.856919657199575      -0.900833739584490     
  -17.9216254330934       -17.7176450107347       -17.4079537824320     
  -17.0235557477147       -16.6024844870994       -16.2260196342793     
  -15.7982841181894       -15.4898403664110     
 -6.946497415423041E-004  0.000000000000000E+000
  0.992682612689747       0.000000000000000E+000
  0.995630325610731       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
