         180           3
   4.24947027608541        5.85114283733521        7.74442252632933     
   21.3215919784913        22.0496368366315        22.7541746872124     
 -1.119135017475609E-003  0.000000000000000E+000
   1.00170070432181       0.000000000000000E+000
  0.998723180059834       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
