         180           8
 -0.791474652782146       -1.02125121030306       -1.13949151696050     
  -1.29280302075014       -1.39700630971949       -1.51930819968532     
  -1.62800975089115       -1.74458247623286     
  -17.2780197897021       -17.0839362799023       -16.7798767863905     
  -16.4001817076916       -15.9920197480793       -15.5718084039163     
  -15.1323014639132       -14.7616748358505     
 -5.048044643743848E-004  0.000000000000000E+000
  0.992684897701271       0.000000000000000E+000
  0.995706730619179       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
