         180           3
   3.97395413459019        5.62598667001707        7.53914721894423     
   21.3459709743316        22.0528792010877        22.7836895658890     
 -1.111148360993005E-003  0.000000000000000E+000
   1.00172125100706       0.000000000000000E+000
  0.998761281133044       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
