         180           8
 -0.665132128764429      -0.872425042056548       -1.01170224665910     
  -1.18611445784339       -1.31344612562871       -1.41650808056160     
  -1.50008050832913       -1.62176992581153     
  -17.2315787709642       -17.1138416921951       -16.7848753248999     
  -16.4122568604446       -16.0110160705355       -15.6153984144743     
  -15.2196437231697       -14.8063201084925     
 -5.424568412132147E-004  0.000000000000000E+000
  0.992689199759425       0.000000000000000E+000
  0.995671655068835       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
