         180           3
   4.06399583001818        5.68467066404365        7.47406263555586     
   21.4017338381950        22.0692192988401        22.8129699422070     
 -1.079646930526881E-003  0.000000000000000E+000
   1.00171324653613       0.000000000000000E+000
  0.998798287163759       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
