         180           8
 -0.709122694864455      -0.936131487167086       -1.03666817727337     
  -1.16360977789055       -1.34697096723392       -1.47807133476325     
  -1.58420549606496       -1.62869965898130     
  -17.0997445649257       -16.9452708983002       -16.6541004557843     
  -16.3225519849378       -15.9598550117800       -15.5764971824470     
  -15.1683765361505       -14.7156982203648     
 -5.945514118029030E-004  0.000000000000000E+000
  0.992907613786764       0.000000000000000E+000
  0.995822110242832       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
