         180           8
 -0.692537548479205      -0.959344294733527       -1.08950208531026     
  -1.21663080193031       -1.36325317938664       -1.52286870614805     
  -1.62912562735745       -1.82387837154365     
  -17.1717479087106       -17.0895098969077       -16.7999233886549     
  -16.4943781635560       -16.1730707980240       -15.7859912730818     
  -15.4124424513004       -14.9485000526122     
 -7.217327589244022E-004  0.000000000000000E+000
  0.993217237122762       0.000000000000000E+000
  0.996185821232446       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
