         180           8
  -1.13286530218792       -1.27923429158095       -1.38079490855261     
  -1.51120095847601       -1.63378642522082       -1.75159265596700     
  -1.87962422578645       -1.95512750648542     
  -16.7222339242041       -16.3648623065499       -16.0624813600312     
  -15.6765591254329       -15.2518506619465       -14.8570018548893     
  -14.4350842368790       -14.0617907046034     
 -3.887398633996150E-004  0.000000000000000E+000
  0.992529811584514       0.000000000000000E+000
  0.995435669354179       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
