         180           3
   4.07193305043009        5.77328185363532        7.77605196537789     
   21.6644523893251        22.5137179835602        23.2530375277641     
 -1.115385690645342E-003  0.000000000000000E+000
   1.00162646943157       0.000000000000000E+000
  0.998537165781090       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
