         180           8
 -0.876072492455323       -1.08084698814240       -1.24253751755466     
  -1.38569320272650       -1.52462836738662       -1.67774167941043     
  -1.77242407277287       -1.88156159133230     
  -16.6769266724840       -16.3427058240432       -16.0506669544145     
  -15.6681469715492       -15.2328787431364       -14.8313582486827     
  -14.4277245757043       -14.0908989986390     
 -4.382275706483215E-004  0.000000000000000E+000
  0.992757807245997       0.000000000000000E+000
  0.995589585945642       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
