         180           8
  -1.07444954197457       -1.35547764148968       -1.46276655413207     
  -1.56600740874959       -1.68817279289679       -1.80617550572263     
  -1.94298571096609       -2.08114014859022     
  -16.6477519723197       -16.2598925900393       -15.9758952770467     
  -15.6168791058900       -15.2099617340086       -14.8313728293762     
  -14.4105425615277       -14.0630381358724     
 -4.958086991146582E-004  0.000000000000000E+000
  0.992927734968452       0.000000000000000E+000
  0.995745240179170       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
