         180           8
  -1.05602205978698       -1.30774297071483       -1.40455314108563     
  -1.55169652407632       -1.71010109153069       -1.82979446629273     
  -1.96595399215264       -1.96302122818188     
  -16.4146311974426       -16.1651212214811       -15.8816278163048     
  -15.5382158884572       -15.1654005506652       -14.7581532020201     
  -14.3190425588011       -13.9818201336006     
 -6.304735156525883E-004  0.000000000000000E+000
  0.993228205980898       0.000000000000000E+000
  0.996078979743770       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
