         180           8
 -0.951886249370924       -1.20081058219201       -1.33745653885025     
  -1.49177515244214       -1.62135991064467       -1.75725247886931     
  -1.87310254389676       -1.94415532533828     
  -16.7382797863832       -16.5064787851162       -16.2072592669739     
  -15.8067898607927       -15.3548371723138       -14.9461395622965     
  -14.5086333705813       -14.1255527332641     
 -5.701049818155773E-004  0.000000000000000E+000
  0.992922883261188       0.000000000000000E+000
  0.995741517717743       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
