         180           3
   4.06367012604238        2.29161286685435       0.862429824437013     
   21.5189693572335        21.4906780135252        22.8007366884232     
 -1.132499717045676E-003  0.000000000000000E+000
   1.00144493225176       0.000000000000000E+000
  0.998481568619324       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
