         180           8
  -1.39761640460857       -1.89068640769273       -2.26206540900628     
  -2.58448031658562       -2.84229693972883       -3.09766996818497     
  -3.31986261126769       -3.41972100046863     
  -17.7240060111407       -17.9881741452952       -18.1782130312301     
  -18.3399735366728       -18.5376137890731       -18.6474027869345     
  -18.3531813663436       -17.9668400903620     
 -6.235700247573709E-004  0.000000000000000E+000
  0.992948879862525       0.000000000000000E+000
  0.995833275089354       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
