         180           8
  -1.43192317419835       -1.88833401614413       -2.26990922096415     
  -2.65876528286993       -2.94281645879091       -3.22228580810260     
  -3.42998749509938       -3.67515110946358     
  -17.4855527401367       -17.7446186528425       -17.9414960055903     
  -18.2905630673974       -18.5979661587237       -18.7767698580257     
  -18.9993922887471       -19.0812075526849     
 -6.726157244639429E-004  0.000000000000000E+000
  0.992987711914342       0.000000000000000E+000
  0.995802195936164       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
