         180           8
  -1.31430872627116       -1.62720009251849       -1.95292666938419     
  -2.32161626554206       -2.61436184657834       -2.83971005190218     
  -3.08430409626551       -3.20756519019786     
  -17.3950858294701       -17.6770971922291       -17.9042298516179     
  -18.1805275831832       -18.4676542854549       -18.7077046863898     
  -18.8721197431857       -19.0900118761737     
 -7.487839174022409E-004  0.000000000000000E+000
  0.993115805185423       0.000000000000000E+000
  0.996005860691070       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
