         180           3
   3.72096409835564        1.70749492413585       0.416913907611817     
   22.1281320945837        22.1680941815676        21.9194101533454     
 -1.089600696011827E-003  0.000000000000000E+000
   1.00171926111980       0.000000000000000E+000
  0.998664001407659       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
