         180           8
 -0.994996254079173       -1.45260375040170       -1.79682147997049     
  -2.15115847417371       -2.47565008559236       -2.73689869304482     
  -2.97356359453892       -3.28313912658738     
  -16.9571091721918       -17.1638956002125       -17.5075453428603     
  -17.8109084438508       -18.1372836203074       -18.4466014938745     
  -19.1146736054236       -19.4729516068475     
 -8.050763763238482E-004  0.000000000000000E+000
  0.993358427448002       0.000000000000000E+000
  0.996256011652754       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
