         180           3
   3.80648314479256        5.48481739847981        7.41262649159686     
   21.3508679086467        22.1661367998360        22.9817705989806     
 -1.063294545891866E-003  0.000000000000000E+000
   1.00169168821955       0.000000000000000E+000
  0.998702015531976       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
