         180           8
 -0.403427152380848      -0.629548880297723      -0.773614383156931     
 -0.908579731423780       -1.03657111604457       -1.16543319532483     
  -1.29852313928784       -1.38189166879694     
  -17.4650148517700       -17.1680770333675       -16.8325034785784     
  -16.4729085923241       -16.0357556459842       -15.5947583023592     
  -15.1577780532528       -14.7629919470381     
 -5.979279146534549E-004  0.000000000000000E+000
  0.992834260812744       0.000000000000000E+000
  0.995756569240675       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
