         164           8
 -0.263346574009281      -0.500217201557193      -0.680338773673017     
 -0.803630234188674      -0.909222216274407       -1.03778799301135     
  -1.15658134075241       -1.43401206002972     
  -17.1791902166832       -17.0362686644229       -16.7698173907714     
  -16.4758956531554       -16.1873480358763       -15.8292141392459     
  -15.4581233656656       -14.9952678003160     
 -6.299790079974958E-004  0.000000000000000E+000
  0.992824518876169       0.000000000000000E+000
  0.995793612056133       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
