         180           8
 -0.602096274710576      -0.776192289499292      -0.934369413529668     
  -1.06041941211028       -1.14518337146601       -1.25599199593792     
  -1.35411450969758       -1.53077713250106     
  -17.4814615704477       -17.2313422651157       -16.9389421754708     
  -16.5608168038873       -16.1500820289280       -15.7333355491844     
  -15.2901273428548       -14.8080627474418     
 -8.075660379477680E-004  0.000000000000000E+000
  0.993405169097941       0.000000000000000E+000
  0.996329779162183       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
