         180           8
 -0.405403224219133      -0.635357704533521      -0.758300286044095     
 -0.887280549292433       -1.00206368207961       -1.12125837016261     
  -1.19230405128428       -1.37320948924293     
  -20.8291689916285       -20.6257746819564       -20.2633721654013     
  -19.8608549003796       -19.3730802378683       -18.9590468278855     
  -18.5762846900792       -18.0638404765347     
 -5.974772388920934E-004  0.000000000000000E+000
  0.993064385240374       0.000000000000000E+000
  0.996010154816343       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
