         180           8
 -0.268888851839639      -0.501894539089534      -0.623734266940304     
 -0.766048666337634      -0.910090124308150       -1.08465374316017     
  -1.21306290416978       -1.31963667595812     
  -20.7671792483928       -20.5336306376570       -20.2243598445798     
  -19.8687869619477       -19.5160513839094       -19.1205476372983     
  -18.7389886670003       -18.2575707715619     
 -5.829409850234593E-004  0.000000000000000E+000
  0.993107196302486       0.000000000000000E+000
  0.996005827115828       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
