         180           8
 -0.502013116484387      -0.674722472109638      -0.812977741069216     
 -0.963494624279446       -1.08392371379583       -1.24579237307478     
  -1.37442010966899       -1.45218608776601     
  -20.6182097105879       -20.4057229283283       -20.1096682094351     
  -19.7622886966591       -19.4216334865645       -19.0484922453893     
  -18.6396885212152       -18.1541377917347     
 -5.883092998786385E-004  0.000000000000000E+000
  0.993125174187897       0.000000000000000E+000
  0.996061016061896       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
