         180           3
   5.31893586280285        3.38970352883073        1.87252190561612     
   19.8705257619476        20.2057958286868        20.4204243289163     
 -1.161611845131920E-003  0.000000000000000E+000
   1.00082001389790       0.000000000000000E+000
  0.997769624900043       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
