         180           8
  -1.97186057282985       -2.35592826338801       -2.73472988877572     
  -3.08300469850677       -3.39801350786621       -3.65736724404039     
  -3.88431140980901       -4.12490147165040     
  -19.1708448264877       -19.3756434163514       -19.5274261347814     
  -19.7085390474001       -19.9480899012472       -20.1634190351245     
  -20.3322709451776       -20.5520040560236     
 -2.719238997920697E-004  0.000000000000000E+000
  0.992424626442788       0.000000000000000E+000
  0.995363547755083       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
