         180           3
   5.31259031486844        3.26614823453113        1.81215241277096     
   19.9885162195718        19.8617729671423        20.0053141044148     
 -1.269077951638104E-003  0.000000000000000E+000
   1.00079398107520       0.000000000000000E+000
  0.997677146220161       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
