         180           8
  -2.14917148691425       -2.50170399845322       -2.83974052112292     
  -3.19684170698747       -3.51937353020841       -3.77258268252893     
  -4.02501033708904       -4.19102023514141     
  -18.9904530624058       -19.2503966047346       -19.6119858199326     
  -19.9958553808534       -20.3320536289631       -20.6062458925417     
  -20.7366131192933       -20.7679343551780     
 -3.297083360155094E-004  0.000000000000000E+000
  0.992480084379416       0.000000000000000E+000
  0.995399576185862       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
