         180           8
  -2.02996125595947       -2.32403189456721       -2.70154192196849     
  -3.04995366495969       -3.38918254929150       -3.65545483922081     
  -3.90919964820058       -4.07750558961499     
  -18.7041726036252       -19.0442376577216       -19.4201086485608     
  -19.6896267574154       -19.9590838863043       -20.2994698460874     
  -20.5665426582747       -20.9010954569960     
 -3.829906443010090E-004  0.000000000000000E+000
  0.992633787663093       0.000000000000000E+000
  0.995573824635211       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
