         180           8
  -2.45121795417011       -2.95621149273105       -3.24099177958618     
  -3.55408252307658       -3.85909955673033       -4.10421816351169     
  -4.36134653434533       -4.51345704701734     
  -17.8892968206933       -18.0600396832013       -18.3437207668102     
  -18.5967161117875       -18.8112145318626       -19.0405420444777     
  -19.2107084390228       -19.4477672941721     
  6.028766553639647E-005  0.000000000000000E+000
  0.991867099403209       0.000000000000000E+000
  0.994793820697115       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
