         180           3
   5.21668734613838        3.31515808929447        1.89333561187566     
   21.2937292167541        21.4641049986237        21.7113432913989     
 -1.073921872003003E-003  0.000000000000000E+000
   1.00070523197233       0.000000000000000E+000
  0.997426135435264       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
