         180           8
  -2.38360434958730       -2.71178779926277       -3.15989738575033     
  -3.53113589471642       -3.83565246517392       -4.11885975999428     
  -4.36280719763784       -4.61837471015657     
  -17.9108024323704       -18.1331410507344       -18.3360206759699     
  -18.5724991765154       -18.8531326038778       -19.0465312026093     
  -19.1689093741619       -19.3783553460034     
  4.196672928310158E-005  0.000000000000000E+000
  0.991940504729378       0.000000000000000E+000
  0.994803596325036       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
