         180           8
  -2.69107782605991       -3.03187059553654       -3.35944050469978     
  -3.70271235573411       -4.00601373282793       -4.29794498511511     
  -4.55721124916700       -4.77839326720988     
  -17.5672499046259       -17.9711190314759       -18.2653247270792     
  -18.5773207236644       -18.8496423205127       -19.0636441805545     
  -19.2173670913677       -19.4346008032227     
  1.191364225022821E-005  0.000000000000000E+000
  0.991930059577375       0.000000000000000E+000
  0.994826817004013       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
