         180           8
 -0.742252599841164       -1.01401317561484       -1.19419875473758     
  -1.34655641477293       -1.45835445667637       -1.60713053817602     
  -1.73160575922945       -1.88586305855864     
  -18.2967376521799       -17.9897848817976       -17.6344769924558     
  -17.2546091136263       -16.8336331303490       -16.4259589366957     
  -16.0265606781608       -15.6999763357739     
 -1.457382817742914E-005  0.000000000000000E+000
  0.992349966968101       0.000000000000000E+000
  0.995194237998107       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
