         180           8
 -0.729180397377469      -0.833474218046058       -1.07863960382322     
  -1.27950307839682       -1.41051910715730       -1.53000000499209     
  -1.66139363286003       -1.75415364897354     
  -18.2330995007630       -17.9712479421081       -17.6087701271138     
  -17.2528973730774       -16.8385561858141       -16.3941822919808     
  -16.0106417968739       -15.5618882403439     
  7.279422216491107E-006  0.000000000000000E+000
  0.992396871006790       0.000000000000000E+000
  0.995202286439553       0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
  0.000000000000000E+000  0.000000000000000E+000
